Tutorial für den Gimp 2.10.18: Das Interface anpassen

Beim allerersten Start des Gimp - also direkt nach der Installation – bekommt ihr Folgendes:

Wie ihr sehen könnt, befindet sich der Gimp da noch im Einfenster-Modus. Wenn das ok ist, braucht ihr zuerst mal weiter nichts zu tun. Bevorzugt ihr aber den Mehrfenster-Modus, dann geht einfach oben in Fenster > Einfenster-Modus und klickt den Haken dort weg.

Dadurch werdet ihr jetzt mit folgendem Interface mit zuerst mal drei Fenstern konfrontiert.

Ich persönlich bevorzuge es jedoch, mit nur zwei Fenstern zu arbeiten; so muß ich nicht dauernd mit drei Fenstern herumjonglieren. Um dahin zu kommen, habt ihr jetzt mehrere Möglichkeite. Am einfachsten ist es, die Docks (oder Tabs oder Reiter) oben im rechten Fenster nach links unten ins sogenannte Werkzeugfenster zu ziehen (seht bitte – aus Platzgründen – auf Seite 3 oben).

Nachdem alle Docks, die bisher im rechten Fenster ganz oben waren, im Werkzeugkasten sind, kommen die Dock ganz rechts in der Mitte dran.

Wenn ihr fertig seid, schließt das rechte Fenster automatisch.

Wird noch ergänzt ...

Tutorial © Copyright 2021 by Claus Cyrny (claus.cyrny@web.de). Alle Rechte vorbehalten.